                            6-01 VERSION DATE:  000501

                 Chapter 6 - Edit Tables

                         Contents

                         ________

       Sub-Section                                      Page

6.0    Contents  .....................................    1

6.1    Introduction ..................................    2

6.2    ELM240T  ......................................    3

6.3    ELM240V  ......................................    4

6.4    ELM442-228C  ..................................    5

6.5    ELM442-360  ...................................    6

6.6    JLM408  .......................................    7

6.7    JSB253B-66B  ..................................    8

6.8    JSB253B  ......................................    9

6.9    OPCAL48  ......................................   10

6.10   PCT252  .......................................   11

6.11   RCT252  .......................................   12

                                 6-02

                      Introduction to Chapter 6

                        NIMS Edit Table Plots

     This chapter contains plots of the NIMS Edit Tables used in E17.
The representative spectra used in these plots are observational
reference spectra for the target body as obtained from telescopic
observations from the Earth.  Each reference spectrum is a composite
of multiple published sources.  Vertical lines below the reference
curves mark the wavelengths selected for return.  Where no spectral
information is available, the selected wavelengths are shown as lines
with amplitude equal to .05 on the vertical axis.

6-03

6-04

6-05

6-06

6-07

6-08

6-09

6-10

6-11

6-12