10^8

10^{10}

10^{12}

10^{14}

10^{16}

10^{18}

10^{20}

10^{22}

10^{24}

Flux (ergs / cm

2-sec)

10^0 10^1 10^2 10^3 10^4 10^5

Area of the Emitting Region (km^2)

1340-1670 �

P = 100 μbar

P = 500 μbar

No Absorption