15

15

15

15

15

15

1515

15

15

15

15

15

20

20

20

20

20

20

20

20

25

25

0˚ 30˚ 60˚ 90˚ 120˚ 150˚ 180˚ 210˚ 240˚ 270˚ 300˚ 330˚ 0˚

-60˚

-40˚

-20˚ 0˚ 20˚ 40˚ 60˚

Gravity Anomaly Error for mgm0964c18 (50x50) (mgm0964c18 = MGS only; W(9902,9903)=0.35 mm/s) Use Kaula*sqrt(2).

Contour Interval 5 mGal; Polar Contour Interval 1 mGal;

North Pole to 60 N South Pole to 60 S

9

9

9

10

10

10

10

10

10

10

11

11

11

11

11

11

11

11

12

12

0˚

30˚

60˚

90˚

120˚

150˚

180˚

210˚

240˚

270˚

300˚

330˚

10

10

10

10

10

10

10

10

10

11

11

11

12

12

12

0˚

30˚

60˚

90˚

120˚

150˚

180˚

210˚

240˚

270˚

300˚

330˚