21.654 21.6545 21.655 21.6555 21.656 80

100

120

140

160

180

200

220

240

260

280

Time (Hours)

Frequency (Hz)

POWERFIT - Carrier Frequency

Exp date = 1997-07-12 File = 71932139.25XR1EF1S101 Dec ratio = 32 Period (sec) = 0.10240