0 500 1000 1500 2000 2500

0

100

200

300

400

500

600

700

800 PREPLOOK - Power Spectrum of Data Samples

Frequency (Hz)

Power (dB)

Exp date = 1999-03-17 File = 90762346.6P1 Total BW = 2500.000 Carrier freq = 1284.180 Max SNR (dB/Hz) = 59.353 Start time (hours) = 23.833 Time/plot (sec) = 0.205