10.2472 10.2474 10.2476 10.2478 10.248 10.2482 10.2484 10.2486 10.2488

-800

-750

-700

-650

-600

-550

-500

-450

Joseph Twicken 21 Jun 1999

MGS Carrier Phase Difference vs. Time -- 1999/134

Time, Hours past Midnight d(phi)/dt, Radians per Second