-1200 -1000 -800 -600 -400 -200 0 200

-120

-100

-80

-60

-40

-20

0

20

40

60 MGS USO Frequency

Day of 2000 Joseph Twicken 31 May 2000

Frequency, +8423153000 Hz

Fit = a3*d^3 + a2*d^2 + a1*d +a0

a3 = 5.1791e-08 Hz/day^3

a2 = -1.3958e-05 Hz/day^2

a1 = 3.4459e-02 Hz/day

a0 = 3.6028e01 Hz