7.952 7.954 7.956 7.958 7.96 7.962 7.964 7.966 7.968 7.97 -30

-25

-20

-15

-10

-5

0 PREPPOWER - Power in Raw Data Samples

Time (Hours)

Power (dB)

Exp date = 1998-01-27 File = ../../PRP/80270745.4P1 Start time (hours) = 7.953 Stop time (hours) = 7.969 Int time (sec) = 0.050