0 500 1000 1500 2000 2500 -50

0

50

100

150

200

250

PREPLOOK - Power Spectrum of Data Samples

Frequency (Hz)

Power (dB)

Exp date = 1998-04-07 File = 80971811.5P1 Total BW = 2500.000 Carrier freq = 1220.703 SNR (dB/Hz) = 42.400 Start time (hours) = 18.194 Time/plot (sec) = 59.802