Mars South Polar region (to 55 S) mgm1004d Gravity Anomalies (mGals) MGS(DOPPLER+XOVERS); 80x80(60x60) Contour Interval: 50 mGals

-100

-50

-50

-50

-50

-50

-50

-50

-50

0˚

30˚

60˚

90˚

120˚

150˚

180˚

210˚

240˚

270˚

300˚

330˚

0

0

0

0

0

0

0

0

0

50

50

100

150